)c (GeV/ Tp 0 0.5 1 1.5 2 2.5 3

Data/Combined BW fit

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 Range of combined fit

- + K +K 0-5% 20-30% 70-80% (b)